1.8 1.85 1.9 1.95 2 2.05 2.1 )^2c

) (GeV/ π (KK DM

0.2 0.4 0.6 0.8 1.0 1.2 310 ×

2c Counts per 8 MeV/

ALICE

= 5.02 TeV NNs Pb, − 50% Pb −30 and charge conj.

+π^−K^+ K

→ ^+πϕ→ ^+_sD c < 6 GeV/ Tp 4 <

Total fit function

Combinatorial background

1.8 1.85 1.9 1.95 2 2.05 2.1 )^2c

) (GeV/ π (KK DM

0.2 0.3 0.4 0.5

|>0.9} ηΔ {SP, | 2v

0.04 ± ) = 0.16 + s(D_2v

ALI-PUB-522138

ALI-PUB-522138